David R. O'Hallaron received the Ph.D. degree in Computer Science from
the University of Virginia, Charlottesville, in 1986.

From 1986 to 1989 he was with the GE Research and Development Center,
Schenectady, NY, as a Computer Scientist. In 1989, he joined the
faculty in the School of Computer Science, Carnegie Mellon University,
Pittsburgh, PA, as a Systems Scientist. His main research interests
are in the areas of programming models, algorithms, and applications
for parallel machines.

