Mean Load

Sdev Load COV Load Max Load

Max/Mean Load

Mean Epoch

Sdev Epoch COV Epoch

Hurst Param Mean Load 1.00

Sdev Load 0.53 1.00

COV Load -0.49 -0.22 1.00

Max Load 0.60 0.18 -0.32 1.00

Max/Mean Load -0.36 -0.39 0.51 0.03 1.00

Mean Epoch -0.04 -0.10 -0.19 0.08 -0.05 1.00

Sdev Epoch -0.02 -0.10 -0.20 0.09 -0.06 0.99 1.00

COV Epoch 0.07 -0.11 -0.23 0.15 -0.02 0.95 0.96 1.00

Hurst Param 0.45 0.58 -0.21 0.03 -0.49 0.08 0.10 0.18 1.00