1024 2048 4096 8192 16384 32768 65536 131072 262144

0.00E+0

2.00E+5

4.00E+5

6.00E+5

8.00E+5

1.00E+6

1.20E+6

1.40E+6

Clocks

Array size n

Standard method Deposit model