Description of Set Isolating the servo’s influence # of Experiments Run 6 Obstacle Distance 45"

Sweeping? No Averaging? Yes for some, No for others Sampling Routine Used * swait 1.0s for some, 0.25s for others vwait n/a iwait 0.10s for sample()/0.20s for closeup() cwait Default