star-amacrine-3-2937229566: Histology

   2212212

     223222B

                          32211

100 uM

                          Motion star-amacrine-3-2937237123: Voltage Plot

        DS-tip-soma
        223222B
        32211
        2212212

 -23.6

 -47.3

 -70.9

  0.0

  23.6
mV

                    60.0  120.  180.  240.  300.
                                                                       mS