September 10, 1993 3:51 pm

Block Diagram of Status Handller

32 (expandable to 64) status registers

control circuit

STATUS

from DM from CM nrst

STA_OE STA_NEW STA_PG (for use of 64 classes)

STA_ALID STA STA_W

STA_ALID STA STA_W