C-1

Appendix C: PCS Manual Pages

This appendix contains copies of the manual pages describing the PCS tools, data movement

calls, and the array combiner calls. The manual page for the PCS introduction is the following:

w pcs_intro

The manual pages for the PCS tools include the following:

w iwcb

w iwalmd

w iwpp

The manual pages for the PCS data movement calls include the following:

w await

w bind

w dynamic

w pcs_init

w preview

w receive

w send

w skip_msg

w test

The manual pages for the PCS array combiner calls include the following:

w network

w place

w port

The PCS manual pages are organized in alphabetical order.