E-1

Appendix E: Error Messages

This following sections list the iWarp-specific FORTRAN compiler error messages.

Err or Messages for SEND and RECEIVE

Error on line nn of foo .f: argument out of range for _receive?

The Channel specified was not GA TE0 or GA TE1 . To correct, make sure you include

‘ ‘f77/gates.h” in the program (before the _RECEIVE?) and change the _RECEIVE? to

specify either GA TE0 or GA TE1 .

Error on line nn of foo .f: argument out of range for _send?

The Channel specified was not GA TE0 or GA TE1 . To correct, make sure you include

‘ ‘f77/gates.h” in the program (before the _SEND?) and change the _SEND? to specify either

GA TE0 or GA TE1 as the first parameter.

Error on line nn of foo .f: bad argument type for _receive?

The Channel is not specified as a constant GA TE0 or GA TE1 ; variables cannot be used. To

correct, make sure you include ‘‘f77/gates.h” in the program (before the _RECEIVE?) and

change the _RECEIVE? to specify either GA TE0 or GA TE1 .

Error on line nn of foo .f: bad argument type for _send

The Channel is not specified as a constant GA TE0 or GA TE1 ; variables cannot be used. To

correct, make sure you include ‘‘f77/gates.h” in the program (before the _SEND?) and

change the _SEND? to specify either GA TE0 or GA TE1 .

Error on line nn of foo .f: _send argument has incompatible type

The second argument of the _SEND? does not match the type specified by the type

designation ‘?’ . The compiler coerces the parameter to the type expected. Apply an explicit

type cast to expressions to coerce them silently to the type desired or use the correct type of

send pseudo-function.

Error on line nn of foo .f: bad number of arguments for _receive

RECEIVE? takes exactly one argument, none were supplied.

Error on line nn of foo .f: bad number of arguments for _receive

RECEIVE? takes exactly one argument, too many were specified.

Err or messages for COND and CONDCALL

Error on line nn of foo .f: argument out of range for _cond

The condition-code specified in the _COND was not a legal value. Only condition-code

names defined by include ‘‘f77/iwarp_cc.h” or include ‘‘f77/iwarp_math_cc.h” should be

used.

Error on line nn of foo .f: argument out of range for _condcall

The condition-code specified in the _CONDCALL was not a legal value. Only

condition-code names defined by include ‘‘f77/iwarp_cc.h” or include

‘ ‘f77/iwarp_math_cc.h” should be used.

E-2

Error on line nn of foo .f: bad number of arguments to intrinsic _cond

Condition testing with _COND takes exactly one argument, none were supplied.

Error on line nn of foo .f: bad number of arguments to intrinsic _condcall

Condition testing with _CONDCALL takes exactly one argument, none were supplied.

Error on line nn of foo .f: bad number of arguments for _cond

Condition testing with _COND takes exactly one argument, too many were supplied.

Error on line nn of foo .f: bad number of arguments for _condcall

Condition testing with _CONDCALL takes exactly one argument, too many were supplied.

Error on line nn of foo .f: bad argument type for _cond

The condition-code specified in the _COND was not a valid type. Only condition-code

names defined by include ‘‘f77/iwarp_cc.h” or include ‘‘f77/iwarp_math_cc.h” should be

used.

Error on line nn of foo .f: bad argument type for _condcall

The condition-code specified in the _CONDCALL was not a valid type. Only condition-code

names defined by include ‘‘f77/iwarp_cc.h” or include ‘‘f77/iwarp_math_cc.h” should be

used.