B-1

Appendix B: Register Names

T able B-1 lists the register names you can use in debugger commands.

T able B-1: Register Names

REGISTER SET REGISTER NAMES

Scratch Registers sr0-sr15

Permanent Registers pr0-pr55

Ar gument Registers ar0-ar15

Function Value Registers fv0-fv3

Frame Pointer fp

Ar gument Pointer ap

C&A Local Memory Access lm0-lm5

Control Space Registers lmrtl fpaflg iluflg

lmrth fpmflg state

nextra loopa sp

nextrb loopc mode

faoper sphi pc

fmoper splo