Robotics Institute, Smith Hall Carnegie Mellon University 5000 Forbes Avenue Pittsburgh, Pennsylvania 15213-3891 Phone: (412) 268-3058 Fax: (412) 621-1970 Internet: epk@cs.cmu.edu

23 June 1995

Charles Weisbin NASA Jet Propulsion Laboratory 4800 Oak Grove Drive Mail Stop 180-603 Pasadena, CA 91109 (818) 354-2013

Dear Chuck,

Enclosed please find one copy of our revised article, and a one-page response to the reviewers.

I am happy to say that we found the reviewers’ comments to be most helpful and productive. Please convey our appreciation.

I am prepared to submit an electronic version of the manuscript, and also original figures. I will wait to hear from the publisher about this.

Sincerely,

Eric Kr otkov