7 Carnegie Mellon

Krotkov & Simmons 7 IJRR Article Figures

Figur e 18 Top view of figure-eight circuit

Figur e 19 Ambler walking 527 m in field

Insert photograph (5" tall)

6 Carnegie Mellon

Krotkov & Simmons 6 IJRR Article Figures

Figur e 13 Dead-reckoned position error

Figure already imported into latex file.

Figur e 14 Task tree for Ambler walk planning

Figur e 15 Timings of Ambler modules

Figur e 16 Task tree with monitors and exception handlers

Figur e 17 Ambler traversing indoor obstacle course

Insert photograph (3" tall)

5 Carnegie Mellon

Krotkov & Simmons 5 IJRR Article Figures

Figur e 9 Elevation map

Occluded

Occluded

Figur e 10 Stack reachability constraint

Figur e 11 Conservative support polygon

Figur e 12 Constraints on geometrically feasible footfalls

4 Carnegie Mellon

Krotkov & Simmons 4 IJRR Article Figures

Figur e 8 Preprocessed range image

(a) (b)

3 Carnegie Mellon

Krotkov & Simmons 3 IJRR Article Figures

Figur e 6 Reflectance and range images

Figur e 7 Perception system modules

PIM IQM LTM

Range Image

Body Pose

Image +

Body Pose

Get Images

Send Images

Get Map Send Map

2 Carnegie Mellon

Krotkov & Simmons 2 IJRR Article Figures

Figur e 2 Circulating gait

Figur e 3 Martian surface

Insert photograph (4.5" tall)

Figur e 4 Modules in the integrated walking system

Figur e 5 Graphical user interface