Schedule Check Specifications Information Performance: General Mechanical Electrical Analysis: Mechanical Electrical Review Failure analysis Test procedures Suggestions Final report

28 29 30 19 20 21 22 26 27 28 02 03 05 09 11

HW-TEAM SCHEDULE 30.JUNE 1993