Robotic Antarctic Meteorite Search

Great Circle Distance Between Sites of Interest

Figure 1: Rough map of sites of interest with estimated great circle distance from Patriot Hills

Patriot Pecora Moulton Hart Stewart Havola Whitmore Patriot 0 613.2 568.0 395.2 436.9 547.6 453.1 Pecora 613.2 0 236.8 297.5 232.6 293.2 517.8 Moulton 568.0 236.8 0 172.9 140.6 60.3 310.0 Hart 395.2 297.5 172.9 0 64.9 157.3 240.1 Stewart 436.9 232.6 140.6 64.9 0 149.0 296.3 Havola 547.6 293.2 60.3 157.3 149.0 0 252.1 Whitmore 453.1 517.8 310.0 240.1 296.3 252.1 0

Table 1: Estimated great circle distance between each pair of sites in kilometers