Page 1 of 1 LRI 94: Lunar Rover Initiative

Carnegie Mellon

Testing Process

Part Exposed?

UV test

Gamma Ray

Low E Proton

Hi E Proton

Total Dose

Cf source SEP Heavy Ion

Latchup